From c04b4f17f123ceb078409630c13d57604827e6f5 Mon Sep 17 00:00:00 2001
From: marcus <marcus@36083f99-b078-4883-b0ff-0f9b5a30f544>
Date: Wed, 22 Oct 2008 11:03:41 +0000
Subject: Semi-working session code. Still won't permit logging in, commented
 out until there is time to fix.

Problem seems to be based around the action_gatekeeper() and the values set for the __elgg_session. Removing this component from the key causes the token to be valid.

My feeling is that the session is not being saved or loaded correctly.

git-svn-id: https://code.elgg.org/elgg/trunk@2291 36083f99-b078-4883-b0ff-0f9b5a30f544
---
 engine/schema/mysql.sql | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'engine/schema/mysql.sql')

diff --git a/engine/schema/mysql.sql b/engine/schema/mysql.sql
index f82a276d6..b0d86f629 100644
--- a/engine/schema/mysql.sql
+++ b/engine/schema/mysql.sql
@@ -275,11 +275,11 @@ CREATE TABLE `prefix_users_sessions` (
 	`id` int(11) NOT NULL auto_increment,
 	`session` varchar(255) NOT NULL,
  	`ts` int(11) unsigned NOT NULL default '0',
-	`data` mediumtext,
+	`data` mediumblob,
 	
 	PRIMARY KEY (`id`),
-	KEY `session` (`session`),
-	KEY `expires` (`expires`)
+	UNIQUE KEY `session` (`session`),
+	KEY `ts` (`ts`)
 ) ENGINE=MyISAM DEFAULT CHARSET=utf8;
 
 -- Datalists for things like db version
-- 
cgit v1.2.3

